<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">* SUSE Linux for IBM z Systems Installation/Rescue System
boot/s390x/linux 0x00000000
boot/s390x/initrd.off 0x0001040c
boot/s390x/initrd.siz 0x00010414
boot/s390x/initrd 0x01000000
boot/s390x/parmfile 0x00010480
</pre></body></html>